en	Configuration / Type

en	Title

en	Enter the title of the configuration here.

en	Config-Type

en	Select a predefined configuration type.

en	Source URL

en	The source URL is used to integrate scripts that must be explicitly integrated in the HEAD section of the website to provide an external service.

en	Source URL loading mode

en	Define here when the source URL may be embedded.

en	Source URL parameter

en	Define the load parameters of the source URL to be used.

en	Script position

en	Here you can select the position for embedding the script.

en	Loading mode of the configuration

en	Define here when the script / configuration may be embedded.

en	ID

en	Enter your ID here.

en	ID

en	Enter your Mess-ID, Container-ID or Google Analytics ID here.

en	Configuration

en	Custom JavaScript code.

en	Insert advanced configuration

en	Google Tag Manager

en	Integrate Google Tag Manager / Google Consent Mode.

en	Google Consent Mode

en	Delivers a predefined configuration for Google Consent Mode. This configuration is overwritten if a custom script has been defined in the "Configuration" field.

en	Custom

en	Configure custom script.

en	Below the content in the body tag

en	Above the content in the body tag

en	Head tag

en	Load only if one of the cookies was accepted

en	Load only if none of the cookies was accepted

en	Load always

en	New

en	Create a new configuration

en	Show details

en	Show the details of cookie ID %s

en	Edit configuration

en	Edit configuration ID %s

en	Duplicate configuration

en	Duplicate configuration ID %s

en	Delete cookie

en	Delete cookie ID %s